
; ----------------------------------------------------------------------

.Patch Names


[CBX-T3 Disk Orchestra]
0=Brass Section 3
1=Trumpet
2=French Horn
3=Saxophone 1
4=Clarinet
5=Oboe
6=Flute 2
7=Accordian
8=String Ensemble 4
9=Violin
10=Pipe Organ
11=Jazz Organ
12=Acoustic Grand Piano 2
13=Electric Piano DX
14=Harpsichord
15=Celesta 2
16=Vibraphone
17=Marimba
18=Clavitone
19=Glockenspiel
20=Synth Brass 3
22=Synth Crystal
23=Timpani 2
24=Acoustic Nylon Guitar
25=Electric Jazz Guitar
26=Electric Clean Guitar
27=Sitar
28=Acoustic Bass
29=Electric Bass Fingered
30=Slap Bass 10
31=Synth Bass 2
40=Muted Trumpet
41=Harmonica
42=Choir Ahhs
43=Combo Organ
44=Synth Wood
45=Synth Strings 3
46=Synth Choir 2
47=Bright Acoustic Piano 2
48=Acoustic Grand Piano 2
49=Honky-tonk Piano
50=Electric Piano 1
51=Electric Grand Piano
52=Synth Piano
53=Acoustic Steel Guitar
54=Electric Clean Guitar
55=Banjo
56=Pizzicato Strings
57=Orchestral Harp
58=Steel Drums
60=Brass Section 3
61=Flute 2
62=String Ensemble 4
63=Choir Ahhs
64=Pipe Organ
65=Jazz Organ
66=Synth Brass 3
67=Saxophone 1
68=Clavinova Tone
69=Electric Clean Guitar
70=Electric Muted Guitar
71=Acoustic Bass
72=Electric Jazz Guitar
73=Pop Brass
74=String Ensemble 2
75=Violin
76=Church Organ
77=Saxophone 2
78=Electric Bass Heavy
79=Flute 2
80=Bassoon
82=Jazz Organ

[CBX-T3 C/M (1-9) MT-32 Compatibility]
0=Acoustic Grand Piano
1=Bright Acoustic Piano
2=Electric Piano 2
3=Electric Grand Piano
4=Electric Grand Piano
5=Electric Piano 2
6=Electric Piano 1
7=Honky-Tonk Piano
8=Drawbar Organ
9=Percussive Organ
10=Percussive Organ
11=Rock Organ
12=Church Organ
13=Reed Organ
14=Church Organ
15=Accordian
16=Harpsichord
17=Harpsichord
18=Harpsichord
19=Clavitone
20=Clavitone
21=Clavitone
22=Celesta 1
23=Celesta 1
24=Synth Brass 1
25=Synth Brass 2
26=Synth Brass 1
27=Synth Brass 2
28=Synth Bass 1
29=Synth Bass 2
30=Synth Bass 1
31=Synth Bass 2
32=Pad 1 (new age)
33=SynHarmo
34=Pad 4 (choir)
35=Pad 5 (bowed)
36=SFX 2 (soundtrack)
37=SFX 4 (atmosphere)
38=SynWarm
39=SynFunny
40=SynEcho 1
41=SFX 1 (rain)
42=SynOboe
43=SynEcho 2
44=SynSolo
45=SynReedOrgan
46=SynBell
47=Lead 1 (square)
48=String Ensemble 1
49=String Ensemble 2
50=Synth Strings 1
51=Pizzicato Strings
52=Violin
53=Viola
54=Cello
55=Cello
56=Contrabass
57=Orchestral Harp
58=Orchestral Harp
59=Acoustic Nylon Guitar
60=Acoustic Steel Guitar
61=Electric Jazz Guitar
62=Electric Clean Guitar
63=Sitar
64=Acoustic Bass
65=Acoustic Bass
66=Electric Bass (fingered)
67=Electric Bass (picked)
68=Slap Bass 1
69=Slap Bass 2
70=Fretless Bass
71=Fretless Bass
72=Flute
73=Flute
74=Piccolo
75=Piccolo
76=Recorder
77=Pan Flute
78=Soprano Sax
79=Alto Sax
80=Tenor Sax
81=Baritone Sax
82=Clarinet
83=Clarinet
84=Oboe
85=English Horn
86=Bassoon
87=Harmonica
88=Trumpet
89=Trumpet
90=Trombone
91=Trombone
92=French Horn
93=French Horn
94=Tuba
95=Brass Section
96=Brass Section
97=Vibraphone
98=Vibraphone
99=MalletSy
100=MalletWind
101=Glockenspiel
102=Tubular Bells
103=Xylophone
104=Marimba
105=Koto
106=Sho
107=Shakuhachi
108=Whistle
109=Whistle
110=Bottle Blow
111=Breathy
112=Timpani 1
113=Melodic Tom
114=DeepSnare
115=Synth Drum
116=SynTom 2
117=Taiko Drum
118=Taiko Rim
119=Cymbal
120=Castanet
121=Triangle
122=Orchestra Hit
123=Telephone Ring
124=Bird
125=Jam
126=EffectWater
127=EffectJungle

[CBX-T3 C/M (11-16) MT-32 Compatibility]
0=Acoustic Grand Piano
1=Acoustic Grand Piano
2=Electric Grand Piano
3=Honky-Tonk Piano
4=Acoustic Grand Piano
5=Bright Acoustic Piano
6=Bright Acoustic Piano
7=Electric Piano 1
8=Electric Piano 1
9=Electric Piano 1
10=Acoustic Steel Guitar
11=Acoustic Steel Guitar
12=Acoustic Steel Guitar 2
13=Electric Muted Guitar 2
14=Electric Muted Guitar 3
15=Slap Bass 3
16=Slap Bass 4
17=Slap Bass 5
18=Slap Bass 6
19=Slap Bass 7
20=Slap Bass 8
21=Slap Bass 5
22=Slap Bass 9
23=Electric Bass (Fingered)
24=Electric Bass (fingered) 2
25=Electric Bass (Picked)
26=Electric Bass (picked) 2
27=Fretless Bass
28=Acoustic Bass
29=Choir Aah 2
30=Choir Aah
31=Choir Aah 3
32=Choir Aah 4
33=String Ensemble 2
34=String Ensemble 1
35=String Ensemble 3
36=String Ensemble 3
37=Drawbar Organ
38=Drawbar Organ
39=Percussive Organ
40=Percussive Organ 2
41=Drawbar Organ
42=Drawbar Organ
43=Percussive Organ
44=Percussive Organ 2
45=Percussive Organ 2
46=Trumpet
47=Trumpet
48=Trombone
49=Trombone
50=Trombone
51=Pop Brass
52=Brass Section 3
53=Brass Section 2
54=Soprano Sax
55=Alto Sax
56=Tenor Sax
57=Baritone Sax
58=Brass Section
59=Pop Brass
60=Brass Section 2
61=Brass Section 2
62=Brass Section 2
63=Orchestra Hit

[CBX-T3 Internal Voices]

; ----------------------------------------------------------------------

.Note Names


; ----------------------------------------------------------------------

.Controller Names


[Yamaha XG Controllers]
0=0-Bank Select MSB
1=1-Modulation
5=5-Portamento Time
6=6-Data Entry MSB
7=7-Master Volume
10=10-Panpot
11=11-Expression
32=32-Bank Select LSB
38=38-Data Entry LSB
64=64-Sustain
65=65-Portamento
66=66-Sostenuto
67=67-Soft Pedal
71=71-Harmonic Content
72=72-Release Time
73=73-Attack Time
74=74-Brightness
84=84-Portamento Control
91=91-Effects Send Level 1 (reverb)
93=93-Effects Send Level 3 (chorus)
94=94-Effects Send Level 4 (variation)
96=96-RPN Increment
97=97-RPN Decrement
98=98-NRPN LSB
99=99-NRPN MSB
100=100-RPN LSB
101=101-RPN MSB
120=120-All Sound Off
121=121-Reset All Controllers
123=123-All Notes Off
124=124-OMNI Off
125=125-OMNI On
126=126-Mono
127=127-Poly

; ----------------------------------------------------------------------

.Instrument Definitions


[Yamaha CBX-T3 (1-9)]
Control=Yamaha XG Controllers
Patch[8192]=CBX-T3 Internal Voices
Patch[14336]=CBX-T3 Disk Orchestra
Patch[16256]=CBX-T3 C/M (1-9) MT-32 Compatibility
Patch[*]=CBX-T3 General Midi

[Yamaha CBX-T3 (11-16)]
Patch[8192]=CBX-T3 Internal Voices
Patch[14336]=CBX-T3 Disk Orchestra
Patch[16256]=CBX-T3 C/M (11-16) MT-32 Compatibility
Patch[*]=CBX-T3 General Midi

